Return time (years)

Daily runoff in mm/day a) Autumn runoff, England and Wales

10% 1%

Chance of exceeding threshold in a given year

1 10 100 0.25

0.3

0.35

0.4

0.45

0.5

0.55

0.6

0.65

Autum 2000

Non-industrial

10% 1%

Return time (years)

Daily peak flow in m3/s b) Spring flow, River Don, UK

1 10 100 0

50

100

150

200

250

300

Spring 2001

Non-industrial

10% 1%

Return time (years)

Monthly temperature equivalent in °C c) July temperatures, Western Russia

1 10 100 13

15

17

19

21

23

25

27

29

2000-2009

1960-1969